X-Git-Url: https://scm.cri.ensmp.fr/git/Faustine.git/blobdiff_plain/1059e1cc0c2ecfa237406949aa26155b6a5b9154..66f23d4fabf89ad09adbd4dfc15ac6b5b2b7da83:/interpretor/lib/src/libsndfile-1.0.25/src/test_endswap.def

diff --git a/interpretor/lib/src/libsndfile-1.0.25/src/test_endswap.def b/interpretor/lib/src/libsndfile-1.0.25/src/test_endswap.def
deleted file mode 100644
index c817322..0000000
--- a/interpretor/lib/src/libsndfile-1.0.25/src/test_endswap.def
+++ /dev/null
@@ -1,20 +0,0 @@
-autogen definitions test_endswap.tpl;
-
-int_type = {
-	name		= short ;
-	value		= 0x3210 ;
-	format		= FMT_SHORT ;
-	} ;
-
-int_type = {
-	name		= int ;
-	value		= 0x76543210 ;
-	format		= FMT_INT ;
-	} ;
-
-int_type = {
-	name		= int64_t ;
-	value		= "0x0807050540302010LL" ;
-	format		= FMT_INT64 ;
-	} ;
-
