X-Git-Url: https://scm.cri.ensmp.fr/git/Faustine.git/blobdiff_plain/1059e1cc0c2ecfa237406949aa26155b6a5b9154..66f23d4fabf89ad09adbd4dfc15ac6b5b2b7da83:/interpretor/lib/src/libsndfile-1.0.25/tests/scale_clip_test.def

diff --git a/interpretor/lib/src/libsndfile-1.0.25/tests/scale_clip_test.def b/interpretor/lib/src/libsndfile-1.0.25/tests/scale_clip_test.def
deleted file mode 100644
index 3459819..0000000
--- a/interpretor/lib/src/libsndfile-1.0.25/tests/scale_clip_test.def
+++ /dev/null
@@ -1,56 +0,0 @@
-autogen definitions scale_clip_test.tpl;
-
-float_type = {
-	float_type_name		= "float" ;
-	float_short_name	= "flt" ;
-	float_upper_name	= "FLOAT" ;
-	float_to_int		= "lrintf" ;
-	} ;
-
-float_type = {
-	float_type_name		= "double" ;
-	float_short_name	= "dbl" ;
-	float_upper_name	= "DOUBLE" ;
-	float_to_int		= "lrint" ;
-	} ;
-
-
-
-int_type = {
-	int_type_name	= "short" ;
-	int_short_name	= "s" ;
-	int_max_value	= 0x7FFFF ;
-	} ;
-
-int_type = {
-	int_type_name	= "int" ;
-	int_short_name	= "i" ;
-	int_max_value	= 0x7FFFFFFF ;
-	} ;
-
-
-
-data_type = {
-	name		= "16" ;
-	bit_count	= 16 ;
-	error_val	= "1.0 / 0x8000" ;
-	} ;
-
-data_type = {
-	name		= "24" ;
-	bit_count	= 24 ;
-	error_val	= "1.0 / 0x800000" ;
-	} ;
-
-data_type = {
-	name		= "32" ;
-	bit_count	= 32 ;
-	error_val	= "1.0 / 0x80000000" ;
-	} ;
-
-data_type = {
-	name		= "08" ;
-	bit_count	= 8 ;
-	error_val	= "1.0 / 0x80" ;
-	} ;
-
