X-Git-Url: https://scm.cri.ensmp.fr/git/Faustine.git/blobdiff_plain/992d59159547267e1491fcd1c5123765b4c452b8..63cf293f572ae7d5c1c83b9dffb31e7d774f8854:/interpretor/lib/src/libsndfile-1.0.25/tests/floating_point_test.def?ds=sidebyside

diff --git a/interpretor/lib/src/libsndfile-1.0.25/tests/floating_point_test.def b/interpretor/lib/src/libsndfile-1.0.25/tests/floating_point_test.def
new file mode 100644
index 0000000..3441d34
--- /dev/null
+++ b/interpretor/lib/src/libsndfile-1.0.25/tests/floating_point_test.def
@@ -0,0 +1,32 @@
+autogen definitions floating_point_test.tpl;
+
+endian_type = {
+	end_name		= little ;
+	end_type		= SF_ENDIAN_LITTLE ;
+	} ;
+
+endian_type = {
+	end_name		= big ;
+	end_type		= SF_ENDIAN_BIG ;
+	} ;
+
+float_type = {
+	float_name		= float ;
+	minor_type		= SF_FORMAT_FLOAT ;
+	} ;
+
+float_type = {
+	float_name		= double ;
+	minor_type		= SF_FORMAT_DOUBLE ;
+	} ;
+
+int_type = {
+	int_name		= short ;
+	int_max			= 0x7FFF ;
+	} ;
+
+int_type = {
+	int_name		= int ;
+	int_max			= 0x7FFFFFFF ;
+	} ;
+
