X-Git-Url: https://scm.cri.ensmp.fr/git/Faustine.git/blobdiff_plain/992d59159547267e1491fcd1c5123765b4c452b8..63cf293f572ae7d5c1c83b9dffb31e7d774f8854:/interpretor/lib/src/libsndfile-1.0.25/tests/scale_clip_test.def?ds=inline

diff --git a/interpretor/lib/src/libsndfile-1.0.25/tests/scale_clip_test.def b/interpretor/lib/src/libsndfile-1.0.25/tests/scale_clip_test.def
new file mode 100644
index 0000000..3459819
--- /dev/null
+++ b/interpretor/lib/src/libsndfile-1.0.25/tests/scale_clip_test.def
@@ -0,0 +1,56 @@
+autogen definitions scale_clip_test.tpl;
+
+float_type = {
+	float_type_name		= "float" ;
+	float_short_name	= "flt" ;
+	float_upper_name	= "FLOAT" ;
+	float_to_int		= "lrintf" ;
+	} ;
+
+float_type = {
+	float_type_name		= "double" ;
+	float_short_name	= "dbl" ;
+	float_upper_name	= "DOUBLE" ;
+	float_to_int		= "lrint" ;
+	} ;
+
+
+
+int_type = {
+	int_type_name	= "short" ;
+	int_short_name	= "s" ;
+	int_max_value	= 0x7FFFF ;
+	} ;
+
+int_type = {
+	int_type_name	= "int" ;
+	int_short_name	= "i" ;
+	int_max_value	= 0x7FFFFFFF ;
+	} ;
+
+
+
+data_type = {
+	name		= "16" ;
+	bit_count	= 16 ;
+	error_val	= "1.0 / 0x8000" ;
+	} ;
+
+data_type = {
+	name		= "24" ;
+	bit_count	= 24 ;
+	error_val	= "1.0 / 0x800000" ;
+	} ;
+
+data_type = {
+	name		= "32" ;
+	bit_count	= 32 ;
+	error_val	= "1.0 / 0x80000000" ;
+	} ;
+
+data_type = {
+	name		= "08" ;
+	bit_count	= 8 ;
+	error_val	= "1.0 / 0x80" ;
+	} ;
+
